Electron Phi

-150 -100 -50 0 50 100 150

Electron Energy Loss

0

20

40

60

80

100 Electron - Phi versus Scintillator Energy Loss Nent = 7670 Mean x = -1.144 Mean y = 3.891 RMS x = 118.8 RMS y = 0.4827

Electron_{Electron - Phi versus Scintillator Energy Loss}

Proton Phi

-150 -100 -50 0 50 100 150

Proton Energy Loss

0

100

200

300

400

500 Proton - Phi versus Scintillator Energy Loss Nent = 7670 Mean x = 0.6867 Mean y = 27.73 RMS x = 125.4 RMS y = 11.82

Proton_{Proton - Phi versus Scintillator Energy Loss}