0 1000 2000 3000 4000 5000 6000 7000 8000 0 100 200 300 400 500 600 700 800 CC[0]_LEFT_ADC Nent = 7199 Mean = 475.2 RMS = 268.7

CC[0]_LEFT_ADC

0 1000 2000 3000 4000 5000 6000 7000 8000 0

100

200

300

400

500 CC[1]_LEFT_ADC Nent = 7199 Mean = 384.6 RMS = 279.6

CC[1]_LEFT_ADC

0 1000 2000 3000 4000 5000 6000 7000 8000 0 100 200 300 400 500 600 700 800 CC[2]_LEFT_ADC Nent = 7199 Mean = 279.6 RMS = 210.1

CC[2]_LEFT_ADC

0 1000 2000 3000 4000 5000 6000 7000 8000 0

200

400

600

800

1000

CC[3]_LEFT_ADC Nent = 7199 Mean = 394.8 RMS = 110.4

CC[3]_LEFT_ADC

0 1000 2000 3000 4000 5000 6000 7000 8000 0

100

200

300

400

500 CC[0]_RIGHT_ADC Nent = 7199 Mean = 472.6 RMS = 323.2

CC[0]_RIGHT_ADC

0 1000 2000 3000 4000 5000 6000 7000 8000 0 100 200 300 400 500 600 700 CC[1]_RIGHT_ADC Nent = 7199 Mean = 210.2 RMS = 181

CC[1]_RIGHT_ADC

0 1000 2000 3000 4000 5000 6000 7000 8000 0

100

200

300

400

500 CC[2]_RIGHT_ADC Nent = 7199 Mean = 279.5 RMS = 374.3

CC[2]_RIGHT_ADC

0 1000 2000 3000 4000 5000 6000 7000 8000 0 100 200 300 400 500 600 700 800 CC[3]_RIGHT_ADC Nent = 7199 Mean = 157.7 RMS = 173

CC[3]_RIGHT_ADC