0 50 100 150 200 250 300 350 0 100 200 300 400 500 600 700 800 CC[0]_LEFT_ADC Nent = 7199 Mean = 308.3 RMS = 19.73

CC[0]_LEFT_ADC

0 50 100 150 200 250 300 350 0

100

200

300

400

500 CC[1]_LEFT_ADC Nent = 7199 Mean = 227.9 RMS = 44.47

CC[1]_LEFT_ADC

0 50 100 150 200 250 300 350 0 100 200 300 400 500 600 700 800 CC[2]_LEFT_ADC Nent = 7199 Mean = 222.6 RMS = 32.31

CC[2]_LEFT_ADC

0 100 200 300 400 500 0

200

400

600

800

1000

CC[3]_LEFT_ADC Nent = 7199 Mean = 373.9 RMS = 33.13

CC[3]_LEFT_ADC

0 50 100 150 200 250 300 0

100

200

300

400

500 CC[0]_RIGHT_ADC Nent = 7199 Mean = 223.2 RMS = 25.98

CC[0]_RIGHT_ADC

0 1000 2000 3000 4000 5000 6000 7000 8000 0 100 200 300 400 500 600 700 CC[1]_RIGHT_ADC Nent = 7199 Mean = 210.2 RMS = 181

CC[1]_RIGHT_ADC

0 100 200 300 400 500 0

100

200

300

400

500 CC[2]_RIGHT_ADC Nent = 7199 Mean = 159.8 RMS = 71.54

CC[2]_RIGHT_ADC

0 100 200 300 400 500 600 700 0 100 200 300 400 500 600 700 800 CC[3]_RIGHT_ADC Nent = 7199 Mean = 136.8 RMS = 86.97

CC[3]_RIGHT_ADC