0 1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

CC[0]_LEFT_ADC Nent = 20249 Mean = 265.6 RMS = 279.7

CC[0]_LEFT_ADC

0 1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

CC[1]_LEFT_ADC Nent = 20249 Mean = 412.6 RMS = 304

CC[1]_LEFT_ADC

0 1000 2000 3000 4000 5000 6000 7000 8000 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

CC[2]_LEFT_ADC Nent = 20249 Mean = 33.46 RMS = 160.6

CC[2]_LEFT_ADC

0 1000 2000 3000 4000 5000 6000 7000 8000 0

500

1000

1500

2000

2500

CC[3]_LEFT_ADC Nent = 20249 Mean = 335.1 RMS = 156.6

CC[3]_LEFT_ADC

0 1000 2000 3000 4000 5000 6000 7000 8000 0

200

400

600

800

1000 CC[0]_RIGHT_ADC

Nent = 20249 Mean = 406.9 RMS = 343.2

CC[0]_RIGHT_ADC

CC[0]_RIGHT_ADC

0 1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

1600

1800 CC[1]_RIGHT_ADC

Nent = 20244 Mean = 173.6 RMS = 193.9

CC[1]_RIGHT_ADC

CC[1]_RIGHT_ADC

0 1000 2000 3000 4000 5000 6000 7000 8000 0 2000

4000

6000

8000

10000

12000

14000

16000

CC[2]_RIGHT_ADC Nent = 20157 Mean = 132.7 RMS = 374.7

CC[2]_RIGHT_ADC

0 1000 2000 3000 4000 5000 6000 7000 8000 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

CC[3]_RIGHT_ADC Nent = 20246 Mean = 33.99 RMS = 172.5

CC[3]_RIGHT_ADC