1300 1400 1500 1600 1700 1800 1900 0 50 100 150 200 250 300

TOF00 Nent = 1489 Mean = 1417 RMS = 50.24

TOF00_{TOF00}

1300 1400 1500 1600 1700 1800 1900 0 100 200 300 400 500 600 700 800

TOF01 Nent = 3691 Mean = 1422 RMS = 42.91

TOF01_{TOF01}

1300 1400 1500 1600 1700 1800 1900 0 100 200 300 400 500 600 700 TOF02 Nent = 3347 Mean = 1412 RMS = 48.84

TOF02_{TOF02}

1300 1400 1500 1600 1700 1800 1900 0 50 100 150 200 250 300 350 400 450

TOF03 Nent = 2280 Mean = 1411 RMS = 55.89

TOF03_{TOF03}

1300 1400 1500 1600 1700 1800 1900 0

20

40

60

80

100

TOF04 Nent = 619 Mean = 1469 RMS = 107

TOF04_{TOF04}

1300 1400 1500 1600 1700 1800 1900 0 20 40 60 80 100 120 140 TOF05 Nent = 914 Mean = 1447 RMS = 105.6

TOF05_{TOF05}

1300 1400 1500 1600 1700 1800 1900 0

50

100

150

200

250

300 TOF06 Nent = 1629 Mean = 1448 RMS = 94.74

TOF06_{TOF06}

1300 1400 1500 1600 1700 1800 1900 0 20 40 60 80 100 120 140 160 180 TOF07 Nent = 1091 Mean = 1456 RMS = 96.4

TOF07_{TOF07}

1300 1400 1500 1600 1700 1800 1900 0 20 40 60 80 100 120

TOF08 Nent = 833 Mean = 1458 RMS = 105.9

TOF08_{TOF08}

1300 1400 1500 1600 1700 1800 1900 0 5 10 15 20 25 30 35 40 45

TOF09 Nent = 313 Mean = 1485 RMS = 131.2

TOF09_{TOF09}

1300 1400 1500 1600 1700 1800 1900 0 10 20 30 40 50 60 70 80 90 TOF10 Nent = 536 Mean = 1466 RMS = 107.4

TOF10_{TOF10}

1300 1400 1500 1600 1700 1800 1900 0 5 10 15 20 25 30 TOF11 Nent = 387 Mean = 1622 RMS = 127.6

TOF11_{TOF11}

1300 1400 1500 1600 1700 1800 1900 0

10

20

30

40

50

60 TOF12 Nent = 849 Mean = 1659 RMS = 122.1

TOF12_{TOF12}

1300 1400 1500 1600 1700 1800 1900 0 5 10 15 20 25 30 35 40

TOF13 Nent = 454 Mean = 1589 RMS = 162.2

TOF13_{TOF13}

1300 1400 1500 1600 1700 1800 1900 0 2 4 6 8 10 12 14 TOF14 Nent = 151 Mean = 1452 RMS = 111.2

TOF14_{TOF14}

1300 1400 1500 1600 1700 1800 1900 0 2 4 6 8 10 12 14 16 18 20 22 TOF15 Nent = 242 Mean = 1492 RMS = 95.47

TOF15_{TOF15}