-1400-1200-1000-800 -600 -400 -200 0 200 400 600 0

1

2

3

4

5

6 htemp Nent = 49 Mean = 379.7 RMS = 254.7

t1d {t1t >0. && t1t<4000. & t1b >0. && t1b<4000.}

350 400 450 500 550 0

0.5

1

1.5

2

2.5

3 htemp Nent = 55 Mean = 439.7 RMS = 60.33

t2d {t2t >0. && t2t<4000. & t2b >0. && t2b<4000.}

200 250 300 350 400 450 500 0

0.5

1

1.5

2

2.5

3 htemp Nent = 60 Mean = 358.9 RMS = 67.12

t3d {t3t >0. && t3t<4000. & t3b >0. && t3b<4000.}

-3500 -3000 -2500 -2000 -1500 -1000 -500 0 500 0

1000

2000

3000

4000

5000

6000

htemp Nent = 32564 Mean = 208.2 RMS = 79.64

t4d {t4t >0. && t4t<4000. & t4b >0. && t4b<4000.}

300 350 400 450 500 550 600 650 0

0.5

1

1.5

2

2.5

3 htemp Nent = 18 Mean = 500.8 RMS = 87.5

t5d {t5t >0. && t5t<4000. & t5b >0. && t5b<4000.} htemp

-200 -150 -100 -50 0 50 100 150 0

0.5

1

1.5

2

2.5

3 htemp Nent = 20 Mean = 19.55 RMS = 102.6

t6d {t6t >0. && t6t<4000. & t6b >0. && t6b<4000.}

200 250 300 350 400 450 500 550 600 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp Nent = 27 Mean = 426.9 RMS = 111.5

t7d {t7t >0. && t7t<4000. & t7b >0. && t7b<4000.}

100 150 200 250 300 350 400 450 500 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp Nent = 28 Mean = 297.9 RMS = 117.8

t8d {t8t >0. && t8t<4000. & t8b >0. && t8b<4000.}

-250 -200 -150 -100 -50 0 50 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp Nent = 24 Mean = -80.21 RMS = 86.64

t9d {t9t >0. && t9t<4000. & t9b >0. && t9b<4000.}

-250 -200 -150 -100 -50 0 50 100 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp Nent = 12 Mean = -98.08 RMS = 91.91

t10d {t10t >0. && t10t<4000. & t10b >0. && t10b<4000.}

-200 -150 -100 -50 0 50 100 150 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp Nent = 22 Mean = -40.18 RMS = 131.5

t11d {t11t >0. && t11t<4000. & t11b >0. && t11b<4000.}

-200 -150 -100 -50 0 50 100 0

0.2

0.4

0.6

0.8

1 htemp Nent = 12 Mean = -83.92 RMS = 81.47

t12d {t12t >0. && t12t<4000. & t12b >0. && t12b<4000.}

-1200 -1000 -800 -600 -400 -200 0 200 0

50

100

150

200

250 htemp Nent = 4507 Mean = -4.277 RMS = 113.8

t13d {t13t >0. && t13t<4000. & t13b >0. && t13b<4000.}

200 300 400 500 600 0

20

40

60

80

100

htemp Nent = 4878 Mean = 399.2 RMS = 108.2

t14d {t14t >0. && t14t<4000. & t14b >0. && t14b<4000.}htemp

-150 -100 -50 0 50 100 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp Nent = 6 Mean = 18.5 RMS = 91.25

t15d {t15t >0. && t15t<4000. & t15b >0. && t15b<4000.}

htemp

0 100 200 300 400 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp Nent = 15 Mean = 160.2 RMS = 148.2

t16d {t16t >0. && t16t<4000. & t16b >0. && t16b<4000.}