-150 -100 -50 0 50 100 150 0 0.5 1 1.5 2 2.5 3 3.5 4 htemp Nent = 67 Mean = 9.03 RMS = 71.96

t1d {t1t >0. && t1t<4000. & t1b >0. && t1b<4000.}

0 50 100 150 200 250 300 0 0.5 1 1.5 2 2.5 3 3.5 4 htemp Nent = 75 Mean = 144 RMS = 65.92

t2d {t2t >0. && t2t<4000. & t2b >0. && t2b<4000.}

-200 0 200 400 600 800 0 1 2 3 4 5 6 7 htemp Nent = 59 Mean = 6.525 RMS = 117.6

t3d {t3t >0. && t3t<4000. & t3b >0. && t3b<4000.}

-3000 -2500 -2000 -1500 -1000 -500 0 500 0 500 1000

1500

2000

2500

3000

3500

4000

4500

htemp Nent = 26566 Mean = 11.98 RMS = 76.73

t4d {t4t >0. && t4t<4000. & t4b >0. && t4b<4000.}

-200 -150 -100 -50 0 50 100 150 200 0 0.5 1 1.5 2 2.5 3 3.5 4 htemp Nent = 78 Mean = 1.051 RMS = 72.62

t5d {t5t >0. && t5t<4000. & t5b >0. && t5b<4000.}

0 500 1000 1500 2000 2500 3000 0 2 4 6 8 10 12 htemp Nent = 72 Mean = 129.1 RMS = 343.4

t6d {t6t >0. && t6t<4000. & t6b >0. && t6b<4000.}

-100 -50 0 50 100 150 200 250 0

0.5

1

1.5

2

2.5

3 htemp Nent = 40 Mean = 66.22 RMS = 96.44

t7d {t7t >0. && t7t<4000. & t7b >0. && t7b<4000.}

-50 0 50 100 150 200 250 300 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp Nent = 26 Mean = 116.3 RMS = 121.4

t8d {t8t >0. && t8t<4000. & t8b >0. && t8b<4000.}

-250 -200 -150 -100 -50 0 50 100 150 0

0.5

1

1.5

2

2.5

3 htemp Nent = 33 Mean = -56.45 RMS = 102.7

t9d {t9t >0. && t9t<4000. & t9b >0. && t9b<4000.}

100 150 200 250 300 350 400 450 500 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp Nent = 7 Mean = 277.9 RMS = 135.1

t10d {t10t >0. && t10t<4000. & t10b >0. && t10b<4000.}

-250 -200 -150 -100 -50 0 50 100 150 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp Nent = 14 Mean = -30.57 RMS = 95.23

t11d {t11t >0. && t11t<4000. & t11b >0. && t11b<4000.}

-150 -100 -50 0 50 100 150 200 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp Nent = 12 Mean = 61.25 RMS = 99.7

t12d {t12t >0. && t12t<4000. & t12b >0. && t12b<4000.}

-200 -100 0 100 200 300 0 20 40 60 80 100 120 140 htemp Nent = 7669 Mean = 51.62 RMS = 107.5

t13d {t13t >0. && t13t<4000. & t13b >0. && t13b<4000.}

-300 -200 -100 0 100 200 0 20 40 60 80 100 120 140 160 180 htemp Nent = 9033 Mean = -29.1 RMS = 107.7

t14d {t14t >0. && t14t<4000. & t14b >0. && t14b<4000.}

-200 -100 0 100 200 300 0 0.5 1 1.5 2 2.5 3 3.5 4 htemp Nent = 53 Mean = 2.189 RMS = 115.8

t15d {t15t >0. && t15t<4000. & t15b >0. && t15b<4000.}

-1500 -1000 -500 0 500 1000 1500 2000 0

50

100

150

200

250 300 htemp Nent = 744 Mean = -3.597 RMS = 110.2

t16d {t16t >0. && t16t<4000. & t16b >0. && t16b<4000.}

htemp