1600 1800 2000 2200 2400 2600 2800 3000 3200 0 0.5 1 1.5 2 2.5 3 3.5 4 htemp Nent = 49 Mean = 1898 RMS = 299.4

a1 {t1t >0. && t1t<4000. & t1b >0. && t1b<4000.}

1500 2000 2500 3000 3500 4000 4500 0

1

2

3

4

5

6 htemp Nent = 55 Mean = 1999 RMS = 523

a2 {t2t >0. && t2t<4000. & t2b >0. && t2b<4000.}

1400 1600 1800 2000 2200 2400 2600 2800 3000 3200 0

0.5

1

1.5

2

2.5

3 htemp Nent = 60 Mean = 1920 RMS = 355.9 a3 {t3t >0. && t3t<4000. & t3b >0. && t3b<4000.} htemp

0 2000 4000 6000 8000 10000 12000 14000 0 1000

2000

3000

4000

5000

6000

7000

8000 htemp

Nent = 32564 Mean = 1995 RMS = 549.9

a4 {t4t >0. && t4t<4000. & t4b >0. && t4b<4000.}

htemp

2000 2500 3000 3500 4000 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp Nent = 18 Mean = 2773 RMS = 576.2

a5 {t5t >0. && t5t<4000. & t5b >0. && t5b<4000.}

2000 2500 3000 3500 4000 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp Nent = 20 Mean = 2667 RMS = 513.6

a6 {t6t >0. && t6t<4000. & t6b >0. && t6b<4000.}

1800 2000 2200 2400 2600 2800 3000 3200 3400 0

0.5

1

1.5

2

2.5

3 htemp Nent = 27 Mean = 2366 RMS = 379.9

a7 {t7t >0. && t7t<4000. & t7b >0. && t7b<4000.}

2000 2200 2400 2600 2800 3000 3200 3400 3600 3800 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp Nent = 28 Mean = 2638 RMS = 448.7

a8 {t8t >0. && t8t<4000. & t8b >0. && t8b<4000.}

2200 2400 2600 2800 3000 3200 3400 3600 3800 4000 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp Nent = 24 Mean = 2897 RMS = 525

a9 {t9t >0. && t9t<4000. & t9b >0. && t9b<4000.}

htemp

1600 1800 2000 2200 2400 2600 2800 3000 3200 3400 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp Nent = 12 Mean = 2348 RMS = 423.9

a10 {t10t >0. && t10t<4000. & t10b >0. && t10b<4000.}

htemp

1500 2000 2500 3000 3500 0

0.5

1

1.5

2

2.5

3 htemp Nent = 22 Mean = 2089 RMS = 506.7

a11 {t11t >0. && t11t<4000. & t11b >0. && t11b<4000.}

1500 1600 1700 1800 1900 2000 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp Nent = 12 Mean = 1753 RMS = 131.1

a12 {t12t >0. && t12t<4000. & t12b >0. && t12b<4000.}

2000 4000 6000 8000100001200014000160001800020000 0 100 200 300 400 500 600 700 htemp Nent = 4507 Mean = 2968 RMS = 1188

a13 {t13t >0. && t13t<4000. & t13b >0. && t13b<4000.}

0 5000 10000 15000 20000 25000 30000 35000 0 200 400 600 800 1000

1200

1400

1600

1800 htemp

Nent = 4878 Mean = 2556 RMS = 957.1

a14 {t14t >0. && t14t<4000. & t14b >0. && t14b<4000.}

htemp

2000 2200 2400 2600 2800 3000 3200 0

0.2

0.4

0.6

0.8

1 htemp Nent = 6 Mean = 2420 RMS = 414.3

a15 {t15t >0. && t15t<4000. & t15b >0. && t15b<4000.}

3000 3500 4000 4500 5000 0

0.2

0.4

0.6

0.8

1 htemp Nent = 15 Mean = 3859 RMS = 557.2

a16 {t16t >0. && t16t<4000. & t16b >0. && t16b<4000.}