2000 3000 4000 5000 6000 7000 0

1 2

3

4

5 6 htemp Nent = 67 Mean = 2774 RMS = 742.2

a1 {t1t >0. && t1t<4000. & t1b >0. && t1b<4000.}

htemp

2000 4000 6000 8000 10000 0 2 4 6 8 10 12 14 16 htemp Nent = 75 Mean = 2487 RMS = 1102

a2 {t2t >0. && t2t<4000. & t2b >0. && t2b<4000.}

1500 2000 2500 3000 3500 4000 4500 0 0.5 1 1.5 2 2.5 3 3.5 4 htemp Nent = 59 Mean = 2367 RMS = 516.4

a3 {t3t >0. && t3t<4000. & t3b >0. && t3b<4000.}

2000 4000 6000 8000 10000 12000 14000 0 1000

2000

3000

4000

5000

6000

7000

8000 htemp

Nent = 26566

Mean = 1945

RMS = 387.5

a4 {t4t >0. && t4t<4000. & t4b >0. && t4b<4000.}

htemp

1800 2000 2200 2400 2600 2800 3000 3200 3400 0 0.5 1 1.5 2 2.5 3 3.5 4 htemp Nent = 78 Mean = 2327 RMS = 357

a5 {t5t >0. && t5t<4000. & t5b >0. && t5b<4000.}

2000 2500 3000 3500 4000 4500 0 1 2 3 4 5 6 7 htemp Nent = 72 Mean = 2537 RMS = 433.9

a6 {t6t >0. && t6t<4000. & t6b >0. && t6b<4000.}

2000 2500 3000 3500 4000 0 0.5 1 1.5 2 2.5 3 3.5 4 htemp Nent = 40 Mean = 2571 RMS = 468.2

a7 {t7t >0. && t7t<4000. & t7b >0. && t7b<4000.}

2000 3000 4000 5000 6000 7000 0

0.5 1

1.5

2 2.5

3 htemp Nent = 26 Mean = 2878 RMS = 1214

a8 {t8t >0. && t8t<4000. & t8b >0. && t8b<4000.}

1600 1800 2000 2200 2400 2600 2800 3000 3200 3400 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp Nent = 33 Mean = 2360 RMS = 395.4

a9 {t9t >0. && t9t<4000. & t9b >0. && t9b<4000.}

2800 2900 3000 3100 3200 3300 3400 3500 3600 0

0.2

0.4

0.6

0.8

1 htemp Nent = 7 Mean = 3189 RMS = 258.7

a10 {t10t >0. && t10t<4000. & t10b >0. && t10b<4000.}

2000 2500 3000 3500 4000 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp Nent = 14 Mean = 2306 RMS = 599.2

a11 {t11t >0. && t11t<4000. & t11b >0. && t11b<4000.}

htemp

1600 1800 2000 2200 2400 2600 2800 0

0.2

0.4

0.6

0.8

1 htemp Nent = 12 Mean = 1964 RMS = 283.5

a12 {t12t >0. && t12t<4000. & t12b >0. && t12b<4000.}

2000 4000 6000 8000 10000 12000 0

200

400

600

800

1000

htemp Nent = 7669 Mean = 2973 RMS = 1553

a13 {t13t >0. && t13t<4000. & t13b >0. && t13b<4000.}

0 5000 10000 15000 20000 25000 0

500

1000

1500

2000

2500 htemp

Nent = 9033 Mean = 3011 RMS = 1683

a14 {t14t >0. && t14t<4000. & t14b >0. && t14b<4000.}

htemp

2000 3000 4000 5000 6000 7000 8000 9000 0

1

2

3

4

5 htemp Nent = 53 Mean = 2818 RMS = 1138

a15 {t15t >0. && t15t<4000. & t15b >0. && t15b<4000.}

2000 2500 3000 3500 4000 4500 0 10 20 30 40 50 60 htemp Nent = 744 Mean = 2248 RMS = 325.2

a16 {t16t >0. && t16t<4000. & t16b >0. && t16b<4000.}