Electron Phi

-30 -20 -10 0 10 20 30

Electron Energy Loss

0 1 2 3 4 5 6 7 8 Electron - Phi versus Scintillator Energy Loss Nent = 7670 Mean x = -0.06923 Mean y = 3.892 RMS x = 8.745 RMS y = 0.4816

Electron Electron - Phi versus Scintillator Energy Loss

Proton Phi

-30 -20 -10 0 10 20 30

Proton Energy Loss

0 10 20 30 40 50 60 70 80 Proton - Phi versus Scintillator Energy Loss Nent = 7670 Mean x = 0.1895 Mean y = 27.89 RMS x = 8.74 RMS y = 11.89

Proton Proton - Phi versus Scintillator Energy Loss