-400 -200 0 200 400 600 800 1000 0

50

100

150

200

250

300 htemp Nent = 14459 Mean = 313.1 RMS = 272.9

(ttl12t+ttl12b-ttr2t-ttr2b)/2. {ttl12b>0&&ttl12t>0&&ttr2t>0&&ttl12b+ttl12t<4000&&ttr2t+ttr2b<4000&&(tcl3<0||tcl3>4000)}

-200 0 200 400 600 800 0 20 40 60 80 100 120 140 160 180 200 220 240 htemp Nent = 11766 Mean = 306.9 RMS = 197.3

(ttl12t+ttl12b-ttr3t-ttr3b)/2. {ttl12b>0&&ttl12t>0&&ttr3t>0&&ttl12b+ttl12t<4000&&ttr3t+ttr3b<4000&&(tcl3<0||tcl3>4000)} htemp

-200 0 200 400 600 800 0 10 20 30 40 50 60 70

htemp Nent = 4447 Mean = 311.9 RMS = 245.8

(ttl12t+ttl12b-ttr4t-ttr4b)/2. {ttl12b>0&&ttl12t>0&&ttr4t>0&&ttl12b+ttl12t<4000&&ttr4t+ttr4b<4000&&(tcl3<0||tcl3>4000)} htemp

-200 -100 0 100 200 300 400 500 0 20 40 60 80 100 120 htemp Nent = 6077 Mean = 50.53 RMS = 173

(ttl12t+ttl12b-ttr5t-ttr5b)/2. {ttl12b>0&&ttl12t>0&&ttr5t>0&&ttl12b+ttl12t<4000&&ttr5t+ttr5b<4000&&(tcl3<0||tcl3>4000)} htemp

0 100 200 300 400 500 600 700 800 900 0 50 100 150 200 250 300 350 htemp Nent = 17385 Mean = 395.4 RMS = 180.3

(ttl13t+ttl13b-ttr2t-ttr2b)/2. {ttl13b>0&&ttl13t>0&&ttr2t>0&&ttl13b+ttl13t<4000&&ttr2t+ttr2b<4000&&(tcl3<0||tcl3>4000)} htemp

0 200 400 600 800 0

50

100

150

200

250

300 htemp Nent = 14388 Mean = 368.6 RMS = 196.8

(ttl13t+ttl13b-ttr3t-ttr3b)/2. {ttl13b>0&&ttl13t>0&&ttr3t>0&&ttl13b+ttl13t<4000&&ttr3t+ttr3b<4000&&(tcl3<0||tcl3>4000)} htemp

0 200 400 600 800 0

20

40

60

80

100 htemp Nent = 5111 Mean = 339.6 RMS = 232.2

(ttl13t+ttl13b-ttr4t-ttr4b)/2. {ttl13b>0&&ttl13t>0&&ttr4t>0&&ttl13b+ttl13t<4000&&ttr4t+ttr4b<4000&&(tcl3<0||tcl3>4000)} htemp

-200 0 200 400 600 800 0 20 40 60 80 100 120

htemp Nent = 6633 Mean = 82.44 RMS = 262.1

(ttl13t+ttl13b-ttr5t-ttr5b)/2. {ttl13b>0&&ttl13t>0&&ttr5t>0&&ttl13b+ttl13t<4000&&ttr5t+ttr5b<4000&&(tcl3<0||tcl3>4000)} htemp

-200 0 200 400 600 0 20 40 60 80 100 120 htemp Nent = 6192 Mean = -3.874 RMS = 211

(ttr12t+ttr12b-ttl2t-ttl2b)/2. {ttr12b>0&&ttr12t>0&&ttl2t>0&&ttr12b+ttr12t<4000&&ttl2t+ttl2b<4000&&(tcr3<0||tcr3>4000)} htemp

-600 -400 -200 0 200 400 600 0 10 20 30 40 50 60 70

htemp Nent = 3952 Mean = -145.1 RMS = 257.8

(ttr12t+ttr12b-ttl3t-ttl3b)/2. {ttr12b>0&&ttr12t>0&&ttl3t>0&&ttr12b+ttr12t<4000&&ttl3t+ttl3b<4000&&(tcr3<0||tcr3>4000)} htemp

-200 -100 0 100 200 300 400 0 20 40 60 80 100 120 140

htemp Nent = 8509 Mean = -54.57 RMS = 169.9

(ttr12t+ttr12b-ttl4t-ttl4b)/2. {ttr12b>0&&ttr12t>0&&ttl4t>0&&ttr12b+ttr12t<4000&&ttl4t+ttl4b<4000&&(tcr3<0||tcr3>4000)} htemp

-400 -200 0 200 400 0 20 40 60 80 100 120 140

htemp Nent = 7754 Mean = -139.5 RMS = 204.5

(ttr12t+ttr12b-ttl5t-ttl5b)/2. {ttr12b>0&&ttr12t>0&&ttl5t>0&&ttr12b+ttr12t<4000&&ttl5t+ttl5b<4000&&(tcr3<0||tcr3>4000)} htemp

-400 -200 0 200 400 600 0 20 40 60 80 100 120 htemp Nent = 7339 Mean = -78.8 RMS = 239.6

(ttr13t+ttr13b-ttl2t-ttl2b)/2. {ttr13b>0&&ttr13t>0&&ttl2t>0&&ttr13b+ttr13t<4000&&ttl2t+ttl2b<4000&&(tcr3<0||tcr3>4000)} htemp

-600 -400 -200 0 200 400 0 10 20 30 40 50 60 70

htemp Nent = 4495 Mean = -236.6 RMS = 255.4

(ttr13t+ttr13b-ttl3t-ttl3b)/2. {ttr13b>0&&ttr13t>0&&ttl3t>0&&ttr13b+ttr13t<4000&&ttl3t+ttl3b<4000&&(tcr3<0||tcr3>4000)} htemp

-400 -300 -200 -100 0 100 200 300 0 20 40 60 80 100 120 140

htemp Nent = 8132 Mean = -200.6 RMS = 169.9

(ttr13t+ttr13b-ttl4t-ttl4b)/2. {ttr13b>0&&ttr13t>0&&ttl4t>0&&ttr13b+ttr13t<4000&&ttl4t+ttl4b<4000&&(tcr3<0||tcr3>4000)} htemp

-1000 -800 -600 -400 -200 0 0 20 40 60 80 100 120 htemp Nent = 7735 Mean = -1000 RMS = 202.1

(ttr13t+ttr13b-ttl5t-ttl5b)/2. {ttr12b>0&&ttr12t>0&&ttl5t>0&&ttr13b+ttr13t<4000&&ttl5t+ttl5b<4000&&(tcr3<0||tcr3>4000)} htemp