2002/07/28 15.45

0 SCCM

1 SCCM

BeamCurrent ΜmAΝ

Rate ΜHzΝ

1 SCCM

BeamCurrent ΜmAΝ

1/Lifetime Μ1/minΝ

0 50 100 150 200 250 300

0 10 20 30 40 50 60 70 80 90

0.1 0.12

0.14

0.16

0.18 0.2 0.22

0.24

0 10 20 30 40 50 60 70 80 90