Electron Theta

10 20 30 40 50 60 70 80

Electron Energy Loss

0 1 2 3 4 5 6 7 8 Electron - Theta versus Scintillator Energy Loss Nent = 1244 Mean x = 26.02 Mean y = 3.737 RMS x = 0.8844 RMS y = 0.2892

Electron_{Electron - Theta versus Scintillator Energy Loss}

Proton Theta

10 20 30 40 50 60 70 80

Proton Energy Loss

0 10 20 30 40 50 60 70 80 Proton - Theta versus Scintillator Energy Loss Nent = 1244 Mean x = 66.24 Mean y = 47.03 RMS x = 0.754 RMS y = 7.159

Proton_{Proton - Theta versus Scintillator Energy Loss}