100 200 300 400 500 600 700 800 900 0

20

40

60

80

100

htemp Nent = 3775 Mean = 368.8 RMS = 138.2

(ttl12t+ttl12b-ttr2t-ttr2b)/2. {ttl12b>0&&ttl12t>0&&ttr2t>0&&ttl12b+ttl12t<4000&&ttr2t+ttr2b<4000&&(atl12t>0&&atl12b>0)} htemp

0 200 400 600 800 0 10 20 30 40 50 60 htemp Nent = 2909 Mean = 338.7 RMS = 149.1

(ttl12t+ttl12b-ttr3t-ttr3b)/2. {ttl12b>0&&ttl12t>0&&ttr3t>0&&ttl12b+ttl12t<4000&&ttr3t+ttr3b<4000&&(atl12t>0&&atl12b>0)} htemp

0 200 400 600 800 0

2

4

6

8

10 htemp Nent = 763 Mean = 365.1 RMS = 196.2

(ttl12t+ttl12b-ttr4t-ttr4b)/2. {ttl12b>0&&ttl12t>0&&ttr4t>0&&ttl12b+ttl12t<4000&&ttr4t+ttr4b<4000&&(atl12t>0&&atl12b>0)} htemp

-400 -300 -200 -100 0 100 200 300 400 500 0 2 4 6 8 10 12 14 16 18

htemp Nent = 932 Mean = 27 RMS = 174.2

(ttl12t+ttl12b-ttr5t-ttr5b)/2. {ttl12b>0&&ttl12t>0&&ttr5t>0&&ttl12b+ttl12t<4000&&ttr5t+ttr5b<4000&&(atl12t>0&&atl12b>0)} htemp

-400 -300 -200 -100 0 100 200 300 400 0

5

10

15

20

25

htemp Nent = 2041 Mean = -13.88 RMS = 148.1

(ttr12t+ttr12b-ttl2t-ttl2b)/2. {ttr12b>0&&ttr12t>0&&ttl2t>0&&ttr12b+ttr12t<4000&&ttl2t+ttl2b<4000&&(atr12t>0&&atr12b>0)} htemp

-400 -300 -200 -100 0 100 200 300 400 500 0 2 4 6 8 10 12 14 htemp Nent = 956 Mean = -135.9 RMS = 188.8

(ttr12t+ttr12b-ttl3t-ttl3b)/2. {ttr12b>0&&ttr12t>0&&ttl3t>0&&ttr12b+ttr12t<4000&&ttl3t+ttl3b<4000&&(atr12t>0&&atr12b>0)} htemp

-500 -400 -300 -200 -100 0 100 200 300 400 0 5 10 15 20 25 30 35 40 45 htemp Nent = 2172 Mean = -39.86 RMS = 156.1

(ttr12t+ttr12b-ttl4t-ttl4b)/2. {ttr12b>0&&ttr12t>0&&ttl4t>0&&ttr12b+ttr12t<4000&&ttl4t+ttl4b<4000&&(atr12t>0&&atr12b>0)} htemp

-400 -200 0 200 400 0

10

20

30

40

50

htemp Nent = 2016 Mean = -129.1 RMS = 158.7

(ttr12t+ttr12b-ttl5t-ttl5b)/2. {ttr12b>0&&ttr12t>0&&ttl5t>0&&ttr12b+ttr12t<4000&&ttl5t+ttl5b<4000&&(atr12t>0&&atr12b>0)} htemp

0 200 400 600 800 1000 0 10 20 30 40 50 60 70 80 90 htemp Nent = 3920 Mean = 403.3 RMS = 164.1

(ttl13t+ttl13b-ttr2t-ttr2b)/2. {ttl13b>0&&ttl13t>0&&ttr2t>0&&ttl13b+ttl13t<4000&&ttr2t+ttr2b<4000&&(atl13t>0&&atl13b>0)} htemp

0 200 400 600 800 0 10 20 30 40 50 60

htemp Nent = 2996 Mean = 390.2 RMS = 167.6

(ttl13t+ttl13b-ttr3t-ttr3b)/2. {ttl13b>0&&ttl13t>0&&ttr3t>0&&ttl13b+ttl13t<4000&&ttr3t+ttr3b<4000&&(atl13t>0&&atl13b>0)} htemp

0 200 400 600 800 1000 0

2

4

6

8

10 htemp Nent = 649 Mean = 348.5 RMS = 177.6

(ttl13t+ttl13b-ttr4t-ttr4b)/2. {ttl13b>0&&ttl13t>0&&ttr4t>0&&ttl13b+ttl13t<4000&&ttr4t+ttr4b<4000&&(atl13t>0&&atl13b>0)} htemp

-200 0 200 400 600 0

5

10

15

20

25 htemp Nent = 880 Mean = 48.38 RMS = 192.2

(ttl13t+ttl13b-ttr5t-ttr5b)/2. {ttl13b>0&&ttl13t>0&&ttr5t>0&&ttl13b+ttl13t<4000&&ttr5t+ttr5b<4000&&(atl13t>0&&atl13b>0)} htemp

-400 -300 -200 -100 0 100 200 300 400 0 5 10 15 20 25 30 35 40 45 htemp Nent = 2134 Mean = -78.62 RMS = 182.6

(ttr13t+ttr13b-ttl2t-ttl2b)/2. {ttr13b>0&&ttr13t>0&&ttl2t>0&&ttr13b+ttr13t<4000&&ttl2t+ttl2b<4000&&(atr13t>0&&atr13b>0)} htemp

-500 -400 -300 -200 -100 0 100 200 300 400 0 2 4 6 8 10 12 14 16 htemp Nent = 1017 Mean = -232.9 RMS = 188

(ttr13t+ttr13b-ttl3t-ttl3b)/2. {ttr13b>0&&ttr13t>0&&ttl3t>0&&ttr13b+ttr13t<4000&&ttl3t+ttl3b<4000&&(atr13t>0&&atr13b>0)} htemp

-400 -200 0 200 400 0 5 10 15 20 25 30 35 40 htemp Nent = 1826 Mean = -153.4 RMS = 169.8

(ttr13t+ttr13b-ttl4t-ttl4b)/2. {ttr13b>0&&ttr13t>0&&ttl4t>0&&ttr13b+ttr13t<4000&&ttl4t+ttl4b<4000&&(atr13t>0&&atr13b>0)} htemp

-1200 -1000 -800 -600 -400 -200 0 10 20 30 40 50 60 htemp Nent = 2026 Mean = -815.8 RMS = 130.5

(ttr13t+ttr13b-ttl5t-ttl5b)/2. {ttr12b>0&&ttr12t>0&&ttl5t>0&&ttr13b+ttr13t<4000&&ttl5t+ttl5b<4000&&(atr13t>0&&atr13b>0)} htemp