400 600 800 1000 1200 1400 1600 1800 0 10 20 30 40 50 60

htemp Nent = 494 Mean = 1692 RMS = 80.82

tnr0 {ttl14b>0&&ttl14t>0&&ttr0t>0&&ttl14b+ttl14t<4000&&ttr0t+ttr0b<4000&&(atl14t>0.0&&atl14b>0.0)} htemp

600 800 1000 1200 1400 1600 1800 0 20 40 60 80 100 120 140 160

htemp Nent = 1330 Mean = 1694 RMS = 78.44

tnr0 {ttl14b>0&&ttl14t>0&&ttr1t>0&&ttl14b+ttl14t<4000&&ttr1t+ttr1b<4000&&(atl14t>0.0&&atl14b>0.0)} htemp

400 600 800 1000 1200 1400 1600 1800 0 20 40 60 80 100 120 140 160 htemp Nent = 1275 Mean = 1693 RMS = 83.3

tnr0 {ttl14b>0&&ttl14t>0&&ttr2t>0&&ttl14b+ttl14t<4000&&ttr2t+ttr2b<4000&&(atl14t>0.0&&atl14b>0.0)} htemp

200 400 600 800 1000 1200 1400 1600 1800 0 20 40 60 80 100 120 htemp Nent = 935 Mean = 1693 RMS = 82.18

tnr0 {ttl14b>0&&ttl14t>0&&ttr3t>0&&ttl14b+ttl14t<4000&&ttr3t+ttr3b<4000&&(atl14t>0.0&&atl14b>0.0)} htemp

600 800 1000 1200 1400 1600 1800 0

20

40

60

80

100

htemp Nent = 776 Mean = 1681 RMS = 104.3

tnr0 {ttr14b>0&&ttr14t>0&&ttl0t>0&&ttr14b+ttr14t<4000&&ttl0t+ttl0b<4000&&(atr14t>0.0&&atr14b>0.0)} htemp

600 800 1000 1200 1400 1600 1800 0 20 40 60 80 100 120 140 160 htemp Nent = 1200 Mean = 1685 RMS = 95.37

tnr0 {ttr14b>0&&ttr14t>0&&ttl1t>0&&ttr14b+ttr14t<4000&&ttl1t+ttl1b<4000&&(atr14t>0.0&&atr14b>0.0)} htemp

600 800 1000 1200 1400 1600 1800 0 20 40 60 80 100 120 140 htemp Nent = 1021 Mean = 1698 RMS = 69.13

tnr0 {ttr14b>0&&ttr14t>0&&ttl2t>0&&ttr14b+ttr14t<4000&&ttl2t+ttl2b<4000&&(atr14t>0.0&&atr14b>0.0)} htemp

1100 1200 1300 1400 1500 1600 1700 0 10 20 30 40 50 60 htemp Nent = 484 Mean = 1693 RMS = 69.62

tnr0 {ttr14b>0&&ttr14t>0&&ttl3t>0&&ttr14b+ttr14t<4000&&ttl3t+ttl3b<4000&&(atr14t>0.0&&atr14b>0.0)} htemp

400 600 800 1000 1200 1400 1600 1800 0

10

20

30

40

50 60 htemp Nent = 438 Mean = 1677 RMS = 127.2

tnr0 {ttl15b>0&&ttl15t>0&&ttr0t>0&&ttl15b+ttl15t<4000&&ttr0t+ttr0b<4000&&(atl15t>0.0&&atl15b>0.0)} htemp

200 400 600 800 1000 1200 1400 1600 1800 0 20 40 60 80 100 120 140 htemp Nent = 1132 Mean = 1689 RMS = 87.81

tnr0 {ttl15b>0&&ttl15t>0&&ttr1t>0&&ttl15b+ttl15t<4000&&ttr1t+ttr1b<4000&&(atl15t>0.0&&atl15b>0.0)} htemp

600 800 1000 1200 1400 1600 1800 0 20 40 60 80 100 120 140 htemp Nent = 1079 Mean = 1691 RMS = 80.28

tnr0 {ttl15b>0&&ttl15t>0&&ttr2t>0&&ttl15b+ttl15t<4000&&ttr2t+ttr2b<4000&&(atl15t>0.0&&atl15b>0.0)} htemp

900 1000 1100 1200 1300 1400 1500 1600 1700 0

20

40

60

80

100 htemp Nent = 752 Mean = 1691 RMS = 77.72

tnr0 {ttl15b>0&&ttl15t>0&&ttr3t>0&&ttl15b+ttl15t<4000&&ttr3t+ttr3b<4000&&(atl15t>0.0&&atl15b>0.0)} htemp

200 400 600 800 1000 1200 1400 1600 1800 0 20 40 60 80 100 120 140 160 180 200 htemp Nent = 1641 Mean = 1683 RMS = 100.1

tnr0 {ttr15b>0&&ttr15t>0&&ttl0t>0&&ttr15b+ttr15t<4000&&ttl0t+ttl0b<4000&&(atr15t>0.0&&atr15b>0.0)} htemp

200 400 600 800 1000 1200 1400 1600 1800 0 50 100

150 200 250 300 htemp Nent = 2449 Mean = 1687 RMS = 103

tnr0 {ttr15b>0&&ttr15t>0&&ttl1t>0&&ttr15b+ttr15t<4000&&ttl1t+ttl1b<4000&&(atr15t>0.0&&atr15b>0.0)} htemp

200 400 600 800 1000 1200 1400 1600 1800 0

50

100

150

200

250 htemp Nent = 2005 Mean = 1694 RMS = 101.3

tnr0 {ttr15b>0&&ttr15t>0&&ttl2t>0&&ttr15b+ttr15t<4000&&ttl2t+ttl2b<4000&&(atr15t>0.0&&atr15b>0.0)} htemp

200 400 600 800 1000 1200 1400 1600 1800 0

20

40

60

80

100

htemp Nent = 868 Mean = 1685 RMS = 112.8

tnr0 {ttr15b>0&&ttr15t>0&&ttl3t>0&&ttr15b+ttr15t<4000&&ttl3t+ttl3b<4000&&(atr15t>0.0&&atr15b>0.0)} htemp