0 2 4 6 8 10 12 14 16 0 2000

4000

6000

8000

10000

12000

14000 h0

Nent = 21032 Mean = 13.81 RMS = 0.6464

h0 h0

0 2 4 6 8 10 12 14 16 0

2000

4000

6000

8000

10000 h1

Nent = 22257 Mean = 13.46 RMS = 0.6114

h1 h1

0 2 4 6 8 10 12 14 16 0 2000

4000

6000

8000

10000

12000 h2

Nent = 17807 Mean = 13.1 RMS = 0.5813

h2 h2

0 2 4 6 8 10 12 14 16 0

2000

4000

6000

8000

10000 h3 Nent = 14049 Mean = 12.76 RMS = 0.5554

h3

0 2 4 6 8 10 12 14 16 0

2000

4000

6000

8000

10000 h4 Nent = 13943 Mean = 12.15 RMS = 0.5627

h4

0 2 4 6 8 10 12 14 16 0

1000

2000

3000

4000

5000

6000 h5 Nent = 10501 Mean = 11.63 RMS = 0.5864

h5

0 2 4 6 8 10 12 14 16 0

1000

2000

3000

4000

5000 h6 Nent = 7696 Mean = 11.06 RMS = 0.6599

h6

0 2 4 6 8 10 12 14 16 0 500 1000

1500

2000

2500

3000 h7

Nent = 5726 Mean = 10.45 RMS = 0.7239

h7 h7

0 2 4 6 8 10 12 14 16 0 200 400 600 800 1000

1200

1400

1600 h8

Nent = 2921 Mean = 9.798 RMS = 0.8137

h8 h8

0 2 4 6 8 10 12 14 16 0 200 400 600 800 1000

1200

1400 h9

Nent = 2443 Mean = 9.295 RMS = 0.8717

h9 h9

0 2 4 6 8 10 12 14 16 0

200

400

600

800

1000 h10

Nent = 2167 Mean = 8.862 RMS = 1.099

h10 h10

0 2 4 6 8 10 12 14 16 0

200

400

600

800

1000 h11 Nent = 1736 Mean = 8.718 RMS = 1.697

h11

0 2 4 6 8 10 12 14 16 0 100 200 300 400 500 600 700 h12 Nent = 1503 Mean = 8.603 RMS = 2.277

h12 h12

0 2 4 6 8 10 12 14 16 0 100 200 300 400 500 600 700 h13 Nent = 1265 Mean = 8.043 RMS = 2.459

h13

0 2 4 6 8 10 12 14 16 0

100

200

300

400

500 h14 Nent = 1180 Mean = 10.18

RMS = 3.807

h14

0 2 4 6 8 10 12 14 16 0

10

20

30

40

50 h15 Nent = 57 Mean = 14.09 RMS = 2.604

h15