1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

htemp Nent = 14369 Mean = 1622 RMS = 940.5

la9t {lt9t >0. && lt9t<4000. && la9t>0. && la9t<8000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 0

200

400

600

800

1000

1200

htemp Nent = 14445 Mean = 1641 RMS = 950.2

la9b {lt9b >0. && lt9b<4000. && la9b>0. && la9b<8000.}

1000 2000 3000 4000 5000 6000 7000 8000 0 100 200 300 400 500 600 700 htemp Nent = 8351 Mean = 1625 RMS = 886.2

la10t {lt10t >0. && lt10t<4000. && la10t>0. && la10t<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0

200

400

600

800

1000 htemp

Nent = 7776 Mean = 1681 RMS = 832.5

la10b {lt10b >0. && lt10b<4000. && la10b>0. && la10b<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

htemp Nent = 16513 Mean = 1704 RMS = 966.7

la11t {lt11t >0. && lt11t<4000. && la11t>0. && la11t<8000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

htemp Nent = 16603 Mean = 1683 RMS = 991.9

la11b {lt11b >0. && lt11b<4000. && la11b>0. && la11b<8000.}

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400 htemp

Nent = 16281 Mean = 1635 RMS = 953.2

la12t {lt12t >0. && lt12t<4000. && la12t>0. && la12t<8000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 0

200 400

600

800

1000

1200 htemp

Nent = 16418 Mean = 1652 RMS = 1030

la12b {lt12b >0. && lt12b<4000. && la12b>0. && la12b<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400 htemp

Nent = 15229 Mean = 1694 RMS = 878.6

la13t {lt13t >0. && lt13t<4000. && la13t>0. && la13t<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

htemp Nent = 15305 Mean = 1679 RMS = 900.5

la13b {lt13b >0. && lt13b<4000. && la13b>0. && la13b<8000.}

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

htemp Nent = 16145 Mean = 1673 RMS = 935.5

la14t {lt14t >0. && lt14t<4000. && la14t>0. && la14t<8000.}

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400 htemp

Nent = 16136 Mean = 1643 RMS = 912.1

la14b {lt14b >0. && lt14b<4000. && la14b>0. && la14b<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

1600

htemp Nent = 15481 Mean = 1579 RMS = 835.9

la15t {lt15t >0. && lt15t<4000. && la15t>0. && la15t<8000.}

1000 2000 3000 4000 5000 6000 7000 8000 0

200

400

600

800

1000

1200 htemp

Nent = 15584 Mean = 1707 RMS = 949.8

la15b {lt15b >0. && lt15b<4000. && la15b>0. && la15b<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

1600 htemp

Nent = 16415 Mean = 1624 RMS = 909

la16t {lt16t >0. && lt16t<4000. && la16t>0. && la16t<8000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

1600

htemp Nent = 16398 Mean = 1612 RMS = 921.9

la16b {lt16b >0. && lt16b<4000. && la16b>0. && la16b<8000.}