0 1000 2000 3000 4000 5000 6000 7000 8000 0 100 200 300 400 500 600 htemp Nent = 7837 Mean = 1848 RMS = 1009

la1t {lt1t >0. && lt1t<4000. && la1t>0. && la1t<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0 100 200 300 400 500 600 700 800 htemp Nent = 7807 Mean = 1653 RMS = 899.8

la1b {lt1b >0. && lt1b<4000. && la1b>0. && la1b<8000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 0 100 200 300 400 500 600 700 htemp Nent = 7240 Mean = 1648 RMS = 917.8

la2t {lt2t >0. && lt2t<4000. && la2t>0. && la2t<8000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 0 100 200 300 400 500 600 700 htemp Nent = 7194 Mean = 1584 RMS = 825.2

la2b {lt2b >0. && lt2b<4000. && la2b>0. && la2b<8000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 0

100

200

300

400

500

600 htemp Nent = 6891 Mean = 1629 RMS = 932.1

la3t {lt3t >0. && lt3t<4000. && la3t>0. && la3t<8000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 0

100

200

300

400

500

600 htemp Nent = 6925 Mean = 1732 RMS = 991

la3b {lt3b >0. && lt3b<4000. && la3b>0. && la3b<8000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 0

100

200

300

400 500 htemp Nent = 6007 Mean = 1598 RMS = 889.5

la4t {lt4t >0. && lt4t<4000. && la4t>0. && la4t<8000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 0

100

200

300

400

500 htemp Nent = 6059 Mean = 1607 RMS = 935.4

la4b {lt4b >0. && lt4b<4000. && la4b>0. && la4b<8000.}

1000 2000 3000 4000 5000 6000 7000 8000 0

200

400

600

800

1000 htemp

Nent = 13402 Mean = 1674 RMS = 955.3

la5t {lt5t >0. && lt5t<4000. && la5t>0. && la5t<8000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 0

200

400

600

800

1000 htemp

Nent = 13435 Mean = 1681 RMS = 1008

la5b {lt5b >0. && lt5b<4000. && la5b>0. && la5b<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

1600

1800

htemp Nent = 15355 Mean = 1582 RMS = 861.2

la6t {lt6t >0. && lt6t<4000. && la6t>0. && la6t<8000.}

1000 2000 3000 4000 5000 6000 7000 8000 0

200

400

600

800

1000

1200

htemp Nent = 15436 Mean = 1937 RMS = 1028

la6b {lt6b >0. && lt6b<4000. && la6b>0. && la6b<8000.}

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400 htemp

Nent = 15540 Mean = 1722 RMS = 921.7

la7t {lt7t >0. && lt7t<4000. && la7t>0. && la7t<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

1600

htemp Nent = 15541 Mean = 1641 RMS = 894.7

la7b {lt7b >0. && lt7b<4000. && la7b>0. && la7b<8000.}

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400 htemp

Nent = 14770 Mean = 1643 RMS = 921.3

la8t {lt8t >0. && lt8t<4000. && la8t>0. && la8t<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400 htemp

Nent = 14774 Mean = 1664 RMS = 922.8

la8b {lt8b >0. && lt8b<4000. && la8b>0. && la8b<8000.}

htemp