1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

1600

1800

htemp Nent = 15628 Mean = 1777 RMS = 800.3

ra9t {rt9t >0. && rt9t<4000. && ra9t>0. && ra9t<8000.}

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

1600

htemp Nent = 15683 Mean = 1835 RMS = 820.7

ra9b {rt9b >0. && rt9b<4000. && ra9b>0. && ra9b<8000.}

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400 htemp

Nent = 15223 Mean = 1656 RMS = 874.1

ra10t {rt10t >0. && rt10t<4000. && ra10t>0. && ra10t<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

1600

1800

htemp Nent = 15116 Mean = 1649 RMS = 822.6

ra10b {rt10b >0. && rt10b<4000. && ra10b>0. && ra10b<8000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

1600

htemp Nent = 17425 Mean = 1653 RMS = 954.7

ra11t {rt11t >0. && rt11t<4000. && ra11t>0. && ra11t<8000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400 htemp

Nent = 17381 Mean = 1674 RMS = 1041

ra11b {rt11b >0. && rt11b<4000. && ra11b>0. && ra11b<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200 htemp

Nent = 15119 Mean = 1701 RMS = 971.4

ra12t {rt12t >0. && rt12t<4000. && ra12t>0. && ra12t<8000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 0

200

400

600

800

1000

1200

htemp Nent = 15043 Mean = 1707 RMS = 1027

ra12b {rt12b >0. && rt12b<4000. && ra12b>0. && ra12b<8000.}

1000 2000 3000 4000 5000 6000 7000 8000 0

200

400

600

800

1000

1200

htemp Nent = 14423 Mean = 1852 RMS = 979.7

ra13t {rt13t >0. && rt13t<4000. && ra13t>0. && ra13t<8000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

1600

1800 htemp

Nent = 14327 Mean = 1641 RMS = 765.4

ra13b {rt13b >0. && rt13b<4000. && ra13b>0. && ra13b<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

1600 htemp

Nent = 16512 Mean = 1629 RMS = 883.9

ra14t {rt14t >0. && rt14t<4000. && ra14t>0. && ra14t<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

1600 htemp

Nent = 16422 Mean = 1667 RMS = 884.1

ra14b {rt14b >0. && rt14b<4000. && ra14b>0. && ra14b<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

1600

1800

htemp Nent = 17759 Mean = 1640 RMS = 874.6

ra15t {rt15t >0. && rt15t<4000. && ra15t>0. && ra15t<8000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

1600 htemp

Nent = 17780 Mean = 1542 RMS = 932.1

ra15b {rt15b >0. && rt15b<4000. && ra15b>0. && ra15b<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

htemp Nent = 15604 Mean = 1964 RMS = 760.8

ra16t {rt16t >0. && rt16t<4000. && ra16t>0. && ra16t<8000.}

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

htemp Nent = 15630 Mean = 2076 RMS = 898.2

ra16b {rt16b >0. && rt16b<4000. && ra16b>0. && ra16b<8000.}