1000 2000 3000 4000 5000 6000 7000 8000 0 100 200 300 400 500 600 700 800 900 htemp Nent = 8235 Mean = 1590 RMS = 820.6

ra1t {rt1t >0. && rt1t<4000. && ra1t>0. && ra1t<8000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 0 100 200 300 400 500 600 700 800 htemp Nent = 8274 Mean = 1643 RMS = 971.6

ra1b {rt1b >0. && rt1b<4000. && ra1b>0. && ra1b<8000.}

1000 2000 3000 4000 5000 6000 7000 8000 0

100

200

300

400

500

600

700 htemp Nent = 7741 Mean = 1683 RMS = 916.3

ra2t {rt2t >0. && rt2t<4000. && ra2t>0. && ra2t<8000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 0

100

200

300

400

500 600 htemp Nent = 7781 Mean = 1709 RMS = 944.5

ra2b {rt2b >0. && rt2b<4000. && ra2b>0. && ra2b<8000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 0

100

200

300

400

500

600 htemp Nent = 7421 Mean = 1712 RMS = 930.1

ra3t {rt3t >0. && rt3t<4000. && ra3t>0. && ra3t<8000.}

1000 2000 3000 4000 5000 6000 7000 8000 0

100

200

300

400

500

600

700 htemp Nent = 7402 Mean = 1652 RMS = 869.3

ra3b {rt3b >0. && rt3b<4000. && ra3b>0. && ra3b<8000.}

1000 2000 3000 4000 5000 6000 7000 8000 0

100

200

300

400

500

600 htemp Nent = 7017 Mean = 1711 RMS = 938.1

ra4t {rt4t >0. && rt4t<4000. && ra4t>0. && ra4t<8000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 0

100

200

300

400 500 htemp Nent = 7044 Mean = 1718 RMS = 950.1

ra4b {rt4b >0. && rt4b<4000. && ra4b>0. && ra4b<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0

200

400

600

800

1000

1200 htemp

Nent = 13075 Mean = 1592 RMS = 921.6

ra5t {rt5t >0. && rt5t<4000. && ra5t>0. && ra5t<8000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

1600 htemp

Nent = 13005 Mean = 1491 RMS = 849.2

ra5b {rt5b >0. && rt5b<4000. && ra5b>0. && ra5b<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0

200

400

600

800

1000

1200

htemp Nent = 12520 Mean = 1680 RMS = 830.2

ra6t {rt6t >0. && rt6t<4000. && ra6t>0. && ra6t<8000.}

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400 htemp

Nent = 12296 Mean = 1676 RMS = 874.3

ra6b {rt6b >0. && rt6b<4000. && ra6b>0. && ra6b<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400

1600

1800

htemp Nent = 15581 Mean = 1536 RMS = 796.3

ra7t {rt7t >0. && rt7t<4000. && ra7t>0. && ra7t<8000.}

1000 2000 3000 4000 5000 6000 7000 8000 0 200 400 600 800 1000

1200

1400 htemp

Nent = 15671 Mean = 1715 RMS = 898.7

ra7b {rt7b >0. && rt7b<4000. && ra7b>0. && ra7b<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0

200

400

600

800

1000

1200 htemp

Nent = 13325 Mean = 1745 RMS = 882.3

ra8t {rt8t >0. && rt8t<4000. && ra8t>0. && ra8t<8000.}

htemp

1000 2000 3000 4000 5000 6000 7000 8000 0

200

400

600

800

1000

1200 htemp

Nent = 13308 Mean = 1925 RMS = 885.8

ra8b {rt8b >0. && rt8b<4000. && ra8b>0. && ra8b<8000.}

htemp