0 100 200 300 400 500 600 700 800 0

10000

20000

30000

40000

50000

60000

70000

htemp Nent = 239467 Mean = 452.3 RMS = 32.41

la1t {lt1t <=0. || lt1t>=4000.}

0 100 200 300 400 500 600 700 800 0

10000

20000

30000

40000

50000

60000 htemp

Nent = 239460 Mean = 433.4 RMS = 31.62

la1b {lt1b <=0. || lt1b>=4000.}

htemp

0 500 1000 1500 2000 2500 0 200 400 600 800 1000

1200

1400

1600

1800

2000 2 x10 htemp Nent = 239662 Mean = 394.3 RMS = 28.94

la2t {lt2t <=0. || lt2t>=4000.}

0 500 1000 1500 2000 2500 0 200 400 600 800 1000

1200

1400

1600

2 x10 htemp Nent = 239650 Mean = 426.8 RMS = 33.02

la2b {lt2b <=0. || lt2b>=4000.}

0 500 1000 1500 2000 2500 3000 0

200

400

600

800

1000

1200

2 x10 htemp Nent = 240002 Mean = 396.1 RMS = 28.97

la3t {lt3t <=0. || lt3t>=4000.}

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 200 400 600 800 1000

1200

1400

1600

2 x10 htemp Nent = 239985 Mean = 365.8 RMS = 27.48

la3b {lt3b <=0. || lt3b>=4000.}

0 200 400 600 800 1000 1200 0

200

400

600

800

1000

1200 2 x10 htemp Nent = 240101 Mean = 386.5 RMS = 27.84

la4t {lt4t <=0. || lt4t>=4000.}

0 100 200 300 400 500 600 700 800 900 0

2000

4000

6000

8000

10000 1 x10 htemp Nent = 240060 Mean = 324.4 RMS = 23.77

la4b {lt4b <=0. || lt4b>=4000.}

0 200 400 600 800 1000 0

2000

4000

6000

8000

10000

1 x10 htemp Nent = 235708 Mean = 470.5 RMS = 33.33

la5t {lt5t <=0. || lt5t>=4000.}

0 200 400 600 800 1000 1200 1400 1600 0 200 400 600 800 1000

1200

1400

1600 2 x10 htemp Nent = 235709 Mean = 459.7 RMS = 32.64

la5b {lt5b <=0. || lt5b>=4000.}

0 200 400 600 800 1000 1200 0

2000

4000

6000

8000

10000

1 x10 htemp Nent = 237137 Mean = 415.2 RMS = 32.41

la6t {lt6t <=0. || lt6t>=4000.}

0 200 400 600 800 1000 1200 0

2000

4000

6000

8000

10000

1 x10 htemp Nent = 237199 Mean = 519.5 RMS = 38.76

la6b {lt6b <=0. || lt6b>=4000.}

0 200 400 600 800 1000 0

2000

4000

6000

8000

10000 1 x10 htemp Nent = 234887 Mean = 536.8 RMS = 38.01

la7t {lt7t <=0. || lt7t>=4000.}

0 200 400 600 800 1000 1200 0

200

400

600

800

1000

1200

2 x10 htemp Nent = 234813 Mean = 511.2 RMS = 36.18

la7b {lt7b <=0. || lt7b>=4000.}

0 1000 2000 3000 4000 5000 6000 0 200 400 600 800 1000

1200

1400

1600

1800 2 x10 htemp Nent = 234714 Mean = 504.1 RMS = 37.21

la8t {lt8t <=0. || lt8t>=4000.}

0 500 1000 1500 2000 2500 3000 3500 4000 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

2400 2 x10 htemp Nent = 234713 Mean = 550.5 RMS = 39.27

la8b {lt8b <=0. || lt8b>=4000.}