0 200 400 600 800 1000 1200 1400 1600 1800 0 200 400 600

800 1000

1200 2 x10 htemp Nent = 238485 Mean = 526.6 RMS = 38.14

ra1t {rt1t <=0. || rt1t>=4000.}

0 200 400 600 800 1000 0 10000

20000

30000

40000

50000

60000

70000

80000

90000 htemp

Nent = 238526 Mean = 371.7 RMS = 28.4

ra1b {rt1b <=0. || rt1b>=4000.}

htemp

0 200 400 600 800 1000 0

2000

4000

6000

8000

10000 1 x10 htemp Nent = 239773 Mean = 441.8 RMS = 31.6

ra2t {rt2t <=0. || rt2t>=4000.}

0 200 400 600 800 1000 0 10000

20000

30000

40000

50000

60000

70000

htemp Nent = 239778 Mean = 400.7 RMS = 31.31

ra2b {rt2b <=0. || rt2b>=4000.}

0 200 400 600 800 1000 1200 1400 1600 0 200 400 600 800 1000

1200

1400 2 x10 htemp Nent = 239581 Mean = 367.6 RMS = 26.97

ra3t {rt3t <=0. || rt3t>=4000.}

0 200 400 600 800 1000 1200 0

200 400

600 800

1000

1200 2 x10 htemp Nent = 239569 Mean = 468.3 RMS = 33.24

ra3b {rt3b <=0. || rt3b>=4000.}

0 500 1000 1500 2000 2500 0 200 400 600 800 1000

1200

1400

1600

1800

2000 2 x10 htemp Nent = 239708 Mean = 457.3 RMS = 32.52

ra4t {rt4t <=0. || rt4t>=4000.}

0 200 400 600 800 1000 1200 1400 1600 0 200 400 600 800 1000

1200

1400 2 x10 htemp Nent = 239694 Mean = 422.3 RMS = 30.27

ra4b {rt4b <=0. || rt4b>=4000.}

0 200 400 600 800 1000 1200 1400 0 200 400 600 800 1000

1200

2 x10 htemp Nent = 235093 Mean = 460.6 RMS = 32.93

ra5t {rt5t <=0. || rt5t>=4000.}

0 500 1000 1500 2000 2500 3000 3500 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200 2 x10 htemp Nent = 235079 Mean = 457 RMS = 33.46

ra5b {rt5b <=0. || rt5b>=4000.}

0 500 1000 1500 2000 2500 0 200 400 600 800 1000

1200

1400

1600

1800

2000 2 x10 htemp Nent = 237590 Mean = 605 RMS = 42.51

ra6t {rt6t <=0. || rt6t>=4000.}

0 500 1000 1500 2000 2500 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200^2x10

htemp Nent = 237802 Mean = 453.5 RMS = 36.42

ra6b {rt6b <=0. || rt6b>=4000.}

0 200 400 600 800 1000 1200 1400 1600 1800 0 200 400 600 800 1000

1200

1400

1600 2 x10 htemp Nent = 234319 Mean = 517.1 RMS = 36.87

ra7t {rt7t <=0. || rt7t>=4000.}

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 200 400 600 800 1000

1200

1400 2 x10 htemp Nent = 234385 Mean = 574.9 RMS = 40.69

ra7b {rt7b <=0. || rt7b>=4000.}

0 200 400 600 800 1000 1200 1400 1600 1800 0

200

400

600

800

1000

1200 2 x10 htemp Nent = 236861 Mean = 630.8 RMS = 44.13

ra8t {rt8t <=0. || rt8t>=4000.}

0 200 400 600 800 1000 1200 1400 1600 1800 0 200 400 600 800 1000

1200

1400

1600 2 x10 htemp Nent = 236932 Mean = 800.6 RMS = 55.22

ra8b {rt8b <=0. || rt8b>=4000.}