0 200 400 600 800 1000 1200 0 10000

20000

30000

40000

50000

60000

70000

80000

htemp Nent = 236135 Mean = 715 RMS = 51.26

ra9t {rt9t <=0. || rt9t>=4000.}

0 200 400 600 800 1000 1200 0

10000

20000

30000

40000

50000

60000

htemp Nent = 236059 Mean = 691.7 RMS = 51.54

ra9b {rt9b <=0. || rt9b>=4000.}

0 200 400 600 800 1000 1200 0

2000

4000

6000

8000

10000

1 x10 htemp Nent = 234659 Mean = 539 RMS = 38.41

ra10t {rt10t <=0. || rt10t>=4000.}

0 200 400 600 800 1000 0

2000

4000

6000

8000

10000 1 x10 htemp Nent = 234763 Mean = 582.2 RMS = 42.18

ra10b {rt10b <=0. || rt10b>=4000.}

0 200 400 600 800 1000 1200 1400 0

200

400

600

800

1000

1200 2 x10 htemp Nent = 233682 Mean = 406 RMS = 30.32

ra11t {rt11t <=0. || rt11t>=4000.}

0 200 400 600 800 1000 0

2000

4000

6000

8000

10000

1 x10 htemp Nent = 233644 Mean = 302.3 RMS = 24.5

ra11b {rt11b <=0. || rt11b>=4000.}

0 200 400 600 800 1000 1200 0

200

400

600

800

1000

1200 2 x10 htemp Nent = 234059 Mean = 464.4 RMS = 33.6

ra12t {rt12t <=0. || rt12t>=4000.}

0 200 400 600 800 1000 1200 0

2000

4000

6000

8000

10000 1 x10 htemp Nent = 234105 Mean = 339.6 RMS = 28.37

ra12b {rt12b <=0. || rt12b>=4000.}

0 200 400 600 800 1000 1200 0

2000

4000

6000

8000

10000 1 x10 htemp Nent = 235228 Mean = 586.5 RMS = 41.77

ra13t {rt13t <=0. || rt13t>=4000.}

0 200 400 600 800 1000 0

2000

4000

6000

8000

10000

1 x10 htemp Nent = 235159 Mean = 702.5 RMS = 49.08

ra13b {rt13b <=0. || rt13b>=4000.}

0 200 400 600 800 1000 1200 1400 0 200 400 600 800 1000

1200

1400 2 x10 htemp Nent = 233549 Mean = 505.3 RMS = 36.36

ra14t {rt14t <=0. || rt14t>=4000.}

0 200 400 600 800 1000 1200 1400 0

200

400

600

800

1000

1200

2 x10 htemp Nent = 233509 Mean = 508.8 RMS = 36.58

ra14b {rt14b <=0. || rt14b>=4000.}

0 200 400 600 800 1000 1200 1400 1600 1800 2000 2200 0 200 400 600 800 1000

1200

1400

1600

1800 2 x10 htemp Nent = 233473 Mean = 501.3 RMS = 36.06

ra15t {rt15t <=0. || rt15t>=4000.}

0 200 400 600 800 1000 1200 1400 1600 1800 2000 2200 0 200 400 600 800 1000

1200

1400

1600 2 x10 htemp Nent = 233379 Mean = 316.1 RMS = 24.61

ra15b {rt15b <=0. || rt15b>=4000.}

0 200 400 600 800 1000 1200 0 10000

20000

30000

40000

50000

60000

70000

80000 htemp

Nent = 238924 Mean = 910 RMS = 63.07

ra16t {rt16t <=0. || rt16t>=4000.}

htemp

0 200 400 600 800 1000 1200 0

10000

20000

30000

40000

50000

60000

htemp Nent = 238805 Mean = 786 RMS = 56.48

ra16b {rt16b <=0. || rt16b>=4000.}