0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 100 200 300 400 500 600 htemp Nent = 3380 Mean = 1569 RMS = 1151

la1t {lt1t>0. && lt1t<4000. && lt1b>0. && lt1b<4000. && la1t>0 && la1t<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 100 200 300 400 500 600 700 800 900 htemp Nent = 3401 Mean = 1365 RMS = 1029

la1b {lt1t>0. && lt1t<4000. && lt1b>0. && lt1b<4000. && la1b>0 && la1b<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 200 400 600 800 1000

1200

1400

1600

1800

2000 htemp

Nent = 4982 Mean = 1214 RMS = 989.2

la2t {lt2t>0. && lt2t<4000. && lt2b>0. && lt2b<4000. && la2t>0 && la2t<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 200 400 600 800 1000

1200

1400

1600

1800 htemp

Nent = 4985 Mean = 1211 RMS = 936.1

la2b {lt2t>0. && lt2t<4000. && lt2b>0. && lt2b<4000. && la2b>0 && la2b<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 500 1000

1500

2000

2500

3000 htemp

Nent = 8504 Mean = 963.3 RMS = 736.6

la3t {lt3t>0. && lt3t<4000. && lt3b>0. && lt3b<4000. && la3t>0 && la3t<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 500 1000

1500

2000

2500

3000

3500

4000

4500

htemp Nent = 8514 Mean = 886.5 RMS = 688.8

la3b {lt3t>0. && lt3t<4000. && lt3b>0. && lt3b<4000. && la3b>0 && la3b<10000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0

500

1000

1500

2000

2500 htemp

Nent = 7911 Mean = 966.4 RMS = 802.9

la4t {lt4t>0. && lt4t<4000. && lt4b>0. && lt4b<4000. && la4t>0 && la4t<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 500 1000

1500

2000

2500

3000 htemp

Nent = 7909 Mean = 863.7 RMS = 732.5

la4b {lt4t>0. && lt4t<4000. && lt4b>0. && lt4b<4000. && la4b>0 && la4b<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 200 400 600 800 1000

1200

1400

1600

1800

htemp Nent = 5347 Mean = 1437 RMS = 1111

la5t {lt5t>0. && lt5t<4000. && lt5b>0. && lt5b<4000. && la5t>0 && la5t<10000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 200 400 600 800 1000

1200

1400

1600 htemp

Nent = 5337 Mean = 1452 RMS = 1190

la5b {lt5t>0. && lt5t<4000. && lt5b>0. && lt5b<4000. && la5b>0 && la5b<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

htemp Nent = 5503 Mean = 1304 RMS = 1117

la6t {lt6t>0. && lt6t<4000. && lt6b>0. && lt6b<4000. && la6t>0 && la6t<10000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0

500

1000

1500

2000

2500

htemp Nent = 5480 Mean = 1402 RMS = 1137

la6b {lt6t>0. && lt6t<4000. && lt6b>0. && lt6b<4000. && la6b>0 && la6b<10000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 500 1000

1500

2000

2500

3000

3500

htemp Nent = 6961 Mean = 1287 RMS = 1008

la7t {lt7t>0. && lt7t<4000. && lt7b>0. && lt7b<4000. && la7t>0 && la7t<10000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0

500

1000

1500

2000

2500

htemp Nent = 6954 Mean = 1249 RMS = 1048

la7b {lt7t>0. && lt7t<4000. && lt7b>0. && lt7b<4000. && la7b>0 && la7b<10000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 200 400 600 800 1000

1200

1400

htemp Nent = 5359 Mean = 1493 RMS = 1175

la8t {lt8t>0. && lt8t<4000. && lt8b>0. && lt8b<4000. && la8t>0 && la8t<10000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 200 400 600 800 1000

1200

1400

1600

1800 htemp

Nent = 5349 Mean = 1527 RMS = 1199

la8b {lt8t>0. && lt8t<4000. && lt8b>0. && lt8b<4000. && la8b>0 && la8b<10000.}

htemp