-1200 -1000 -800 -600 -400 -200 0 200 400 600 800 0 5 10 15 20 25 30 35 40 45 htemp Nent = 2069 Mean = -335.8 RMS = 378.6

ttr-ttl {ntl==13&&ntr==3} htemp

-1200 -1000 -800 -600 -400 -200 0 200 400 600 800

-300

-200

-100 0 100 200 300 400 ptr+ptl:ttr-ttl {ntl==13&&ntr==3}

-1200 -1000 -800 -600 -400 -200 0 200 400 600 800 0 5000

10000

15000

20000

25000

30000

35000 atl:ttr-ttl {ntl==13&&ntr==3}

-800 -600 -400 -200 0 200 0

5

10

15

20

25 htemp Nent = 369 Mean = -513.2 RMS = 67.62

ttr-ttl {ntl==13&&ntr==3&&atl>7500} htemp