-1200 -1000 -800 -600 -400 -200 0 200 400 600 0 10 20 30 40 50 60 70 htemp Nent = 4790 Mean = -543.1 RMS = 229.7

ttr-ttl {ntl==13&&ntr==2} htemp

-1200 -1000 -800 -600 -400 -200 0 200 400 600

-200

-100 0 100 200 300 400 500 ptr+ptl:ttr-ttl {ntl==13&&ntr==2}

-1200 -1000 -800 -600 -400 -200 0 200 400 600 0 5000

10000

15000

20000

25000

30000

35000 atl:ttr-ttl {ntl==13&&ntr==2}

-1200 -1000 -800 -600 -400 -200 0 200 400 600 0 10 20 30 40 50 60 70 htemp Nent = 2808 Mean = -634.4 RMS = 89.55

ttr-ttl {ntl==13&&ntr==2&&atl>5000} htemp