-1000 -800 -600 -400 -200 0 200 400 600 800 0 2 4 6 8 10 12 14 16 htemp Nent = 386 Mean = 76.21 RMS = 176.4

ttr-ttl {ntl==0&&ntr==14} htemp

-1000 -800 -600 -400 -200 0 200 400 600 800 0 2 4 6 8 10 12 14 16 htemp Nent = 386 Mean = 76.21 RMS = 176.4

ttr-ttl {ntl==0&&ntr==14} htemp_{Nent = 386}

-50 0 50 100 150 200 0 1 2 3 4 5 6 7 htemp Nent = 318 Mean = 129.3 RMS = 22.46

ttr-ttl {ntl==0&&ntr==14&&nwr>15&&nwl>15} htemp_{Nent = 318}