eθ 20 30 40 50 60 70 80 90

Left Target Asymmetry

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 0.25 0.3

A1 left (pp-pm) A2 left (mp-mm)

eθ 20 30 40 50 60 70 80 90

Right Target Asymmetry

-0.4

-0.2 -0 0.2 0.4 0.6 0.8

A1 right (pp-pm) A2 right (mp-mm)

eθ 20 30 40 50 60 70 80 90

Left Beam Asymmetry

-0.2

-0.1

0

0.1

0.2

A3 left (pp-mp) A4 left (pm-mm)

eθ 20 30 40 50 60 70 80 90

Right Beam Asymmetry

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4

A3 right (pp-mp) A4 right (pm-mm)

eθ 20 30 40 50 60 70 80 90

Target Super Ratio

-500

-400

-300

-200

-100 0 100 200 300 400

Super Ratio 1 Super Ratio 2

eθ 20 30 40 50 60 70 80 90

Beam Super Ratio

-100

-50

0

50

100

Super Ratio 3 Super Ratio 4