htemp Entries 200202 Mean 0.6013 RMS 0.1586

-1 -0.5 0 0.5 1 0 5000

10000

15000

20000

25000

30000

35000

40000 pml

htemp Entries 200202 Mean 0.6029 RMS 0.1586

-1 -0.5 0 0.5 1 0 5000

10000

15000

20000

25000

30000

35000

40000 pmr

htemp Entries 200202 Mean 47.15 RMS 15.63

-100 -50 0 50 100 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000 tml

htemp Entries 200202 Mean 46.99 RMS 15.63

-100 -50 0 50 100 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000 tmr

htemp Entries 200202 Mean 0.05369 RMS 13

-100 -80 -60 -40 -20 0 20 0

1000

2000

3000

4000

5000

6000 fml

htemp Entries 200202 Mean 180.1 RMS 13.06

-100 -50 0 50 100 150 200 0 2000

4000

6000

8000

10000

12000

14000

16000 fmr

htemp Entries 200198 Mean 0.006574 RMS 8.178

-20 -15 -10 -5 0 5 10 15 20 0

1000

2000

3000

4000

5000

zml {zml>-100. && zml<100.}

htemp Entries 200198 Mean 0.006574 RMS 8.178

-20 -15 -10 -5 0 5 10 15 20 0

1000

2000

3000

4000

5000

zmr {zmr>-100. && zmr<100.}

htemp Entries 200198 Mean 0.004426 RMS 1

-1 -0.5 0 0.5 1 0

2000

4000

6000

8000

10000 1 x10 qml {qml>-2. && qml <2.}

htemp Entries 200198 Mean -0.004426 RMS 1

-1 -0.5 0 0.5 1 0

2000

4000

6000

8000

10000 1 x10 qmr {qmr>-2. && qmr <2.}