htemp

Entries 200198

Mean -0.005

RMS 0.695

-0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 0

2000

4000

6000

8000

10000 1 x10 pe {pe>-2. && pe <2.}

htemp

Entries 200198

Mean 0.55

RMS 1.237e-06

-0.5 0 0.5 1 1.5 0 200 400 600 800 1000

1200

1400

1600

1800

2000 2 x10 pz {pz>-2. && pz <2.}