htemp

Entries 100542 Mean 0.4691 RMS 0.1087

0.4 0.5 0.6 0.7 0.8 0.9 0

1000

2000

3000

4000

5000

6000 htemp

pml {qml>0.&&qmr<0.} htemp Entries 99656 Mean 0.4696 RMS 0.1094

0.4 0.5 0.6 0.7 0.8 0.9 0

1000

2000

3000

4000

5000

6000 htemp

pmr {qmr>0.&&qml<0.}

htemp

Entries 74963 Mean -0.05551 RMS 0.04015

-0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

(pwl-pml)/pml {pwl>0.1&&pwl<0.9&&qwl>0.&&qwr<0.}

htemp

Entries 73907 Mean 0.03279 RMS 0.04892

-0.5 0 0.5 1 1.5 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

(pwr-pmr)/pmr {pwr>0.1&&pwr<0.9&&qwr>0.&&qwl<0.}