Xsection Entries 27782 Mean 7.974 RMS 4.789

0 2 4 6 8 10 12 14 0

1000

2000

3000

4000

5000 tof number

ABS data - Cell Conductance( M=1 )

ABS data - Cell Conductance( M=1 )

ABS data - Cell Conductance ( M=1 )

RED = Right Sector data BLUE = Left Sector data BLACK = MonteCarlo

(dashed conductance for M=2)