htemp Entries 153 Mean 19.6 RMS 8.867

5 10 15 20 25 30 35 40 0

2

4

6

8

10

12 ttwl-ttwr {qwl==1&qwr==-1 &twl>20&twl<80 &twr>20&twr<80 &xwl<0.1&xwr<0.1&ntwl==15&ntwr==0}