htemp Entries 153 Mean 0.7594 RMS 7.139

-20 -10 0 10 20 0

2

4

6

8

10

fwr-fwl-180 {qwl==1&qwr==-1 &twl>20&twl<80 &twr>20&twr<80 &xwl<0.1&xwr<0.1&ntwl==15&ntwr==0}