htemp Entries 17072 Mean 1450 RMS 708.9

0 500 1000 1500 2000 2500 3000 3500 0 100

200 300 400 500 600

700 ttl {ntl==0}_{htemp}

Entries 2304 Mean 1548 RMS 816.3

0 500 1000 1500 2000 2500 3000 3500 0 20 40 60 80 100 120 140 160 htemp

ttl {ntl==0&&trig==1}

htemp Entries 17278 Mean 1381 RMS 854.8

500 1000 1500 2000 2500 3000 3500 0 200 400 600 800 1000

1200

1400

1600 ttr {ntr==0}_{htemp}

Entries 61 Mean 1000 RMS 65.37

950 1000 1050 1100 1150 1200 1250 0

0.5

1

1.5

2

2.5

3 htemp

ttl {ntl==0&&trig==1&&nwl>17&&nwr>17}