[GeV] L mp 0 0.020.040.06 0.08 0.1 0.12 0.14 0.160.18 0.2

0 Left S

-1

-0.5

0

0.5

1

exp]_0

Left [S the]_0

Left [S

Left Unpolarized Cross Section

[GeV] L mp 0 0.020.040.06 0.08 0.1 0.12 0.14 0.160.18 0.2

0 Right S

-1

-0.5

0

0.5

1

exp]_0

Right [S the]_0

Right [S

Right Unpolarized Cross Section