TOF POSITION FOR DIFFERENT CALIB FILES

paddle

0 2 4 6 8 10 12 14 16 ptl

-200

-150

-100 -50 0 50 100 150 200 zero offsets h1

paddle

0 2 4 6 8 10 12 14 16 ptl

-200

-150

-100 -50 0 50 100 150 200 flasher 1326 offsets h2

paddle

0 2 4 6 8 10 12 14 16 ptl

-200

-150

-100 -50 0 50 100 150 200 offsets from raw H2 data h3