htemp Entries 23790 Mean 989.7 RMS 8.333

900 920 940 960 980 1000 1020 1040 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200 ttl {ntwl==0&&ttl<1050&&ttl>900&&(run<1703||run>1713)}