mass

mright Entries 239296 Mean 0.7402 RMS 0.2314

0 0.5 1 1.5 2 2.5 3 0 2000

4000

6000

8000

10000

12000

14000 mright

mrightold Entries 239296 Mean 0.7161 RMS 0.218

0 0.5 1 1.5 2 2.5 3 0 2000

4000

6000

8000

10000

12000

14000 mright old