0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 q2l , neutrons 2Q

electron-left,neutron-right

electron-right,neutron-left