Scattering Angle (deg)

0 20 40 60 80 100 120 140 160 180 0

0.01

0.02

0.03

0.04

0.05

0.06

< 15mm)

beam

Photon Normalized Rate ( 5mm < r

Scattering Angle (deg)

0 20 40 60 80 100 120 140 160 180

Photon Energy (MeV)

0

5

10

15

20

25

30

35

40 < 15mm)

beam

Photon Energy ( 5mm < r