cc Entries 13537 Mean 338.6 RMS 56.61

200 300 400 500 600 700 800 0

2

4

6

8

10

12 cc^{bb}Entries 20324_{Mean 394.5RMS 150.3}

Thresh = 31.3 mV - Peak = 315

Thresh = 36.5 mV - Peak = 360

Thresh = 41.7 mV - Peak = 403