2003/10/28 11.23

CFD-Thresh ΜmVΝ

Energy ΜMeVeeΝ

0.6667E-02/ 1 P1 0.1818 P2 0.3046E-01

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

0 5 10 15 20 25 30 35 40 45 50