G

ID Entries Mean RMS

12345 32 2999. 97.84 0.000 / 14 Constant 2.609 Mean 2999. Sigma 97.84

COMMON /PAWC/ in memory

2003/11/28 21.56

0

1

2

3

4

5

2000 2200 2400 2600 2800 3000 3200 3400 3600 3800 4000