htemp Entries 2096 Mean 0.5208 RMS 0.4111 / ndf

2χ 22.42 / 4 Constant 5.509±

86.78 Mean 0.01104 ± 0.1775 Sigma 0.01307 ± 0.1335

mass (GeV)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 0 50 100 150 200 250 300 350 400 ± ±

tracks.mmass