htemp Entries 2043 Mean 0.5228 RMS 0.4098 / ndf

2χ 12.53 / 6 Constant 6.163±

133.7 Mean 0.009766 ± 0.8947 Sigma 0.01037 ± 0.203

mass (GeV)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 0 50 100 150 200 250 300 350 400 450 ± ±

tracks.mmass