ABS EPICS Info

Dissociator

H2 flow        *  0
D2 flow        *  23.6386
O2 flow        *  0.0512821
RF fwd power   *  288.817
RF rev power   *  3.49212
Nozz Temp.     *  78.849
Nozz heater       0

ABS/BRP Pressures

C1             *  10.0382
Nozzle         *  0.000131703
Skimmer        *  2.39724e-05
6P Top         *  1.60979e-07
6P Bottom      *  1.90498e-07
TC - ligit     *  4.51966e-08
BRP bgd        *  9.46548e-08
BRP center     *  4.35237e-08
BRP up         *  3.56033e-08
BRP down       *  5.38389e-08

Valve Status

Valve 10       *  OPEN
Valve 11       *  OPEN
Sextupole T    *  OPEN
Sextupole B    *  OPEN
Valve 14       *  OPEN
Valve 15       *  OPEN

RF-Transitions

MFT Ampl.         -5
SFT Ampl.         4
WFT Ampl.         -90
B-Bset MFT        0.0222338
B-Bset SFT/WFT    -0.0260699

Cell and Target

Cell Temp.     *  104.877
Cell heater       1
B long         *  234.617
B trans        *  251.702
BLAST PS       *  6727.62