Reconstructed Phi and Z, runs 4954,4955

-15 -10 -5 0 5 10 165

170

175

180

185

190

195 leftϕ :

right

ϕ_{Entries 1002}

Constant 75.57 Mean 0.3576 Sigma 1.03

-10 -8 -6 -4 -2 0 2 4 6 8 10 0 10 20 30 40 50 60 70 80

Entries 1002 leftϕ - right ϕ

-30 -20 -10 0 10 20 30 40 -30 -20 -10 0 10 20 30 40 left : z right

z_{Entries 1002}

Constant 44.33 Mean 0.03707 Sigma 3.067

-20 -15 -10 -5 0 5 10 15 0

10

20

30

40

50

Entries 1002 left - z right z