Reconstructed Beam Energy, runs 4954,4955

Entries 650 Constant 28.89 Mean 0.8218 Sigma 0.051

0.6 0.7 0.8 0.9 1 1.1 0 5 10 15 20 25 30 35 40 left e beam

E_{Entries 1002}

Constant 65.85 Mean 0.862 Sigma 0.04384

0.5 0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 0 10 20 30 40 50 60 70 80

Entries 1002 right e beam E