theta histogram5411-5641

Entries 10577

0 0.5 1 1.5 2 2.5 0

100

200

300

400

500

600 reconstructed mass Entries 5227

-30 -20 -10 0 10 20 30 0 20 40 60 80 100 120 140 160 180 electron vertex

Entries 4983

-15 -10 -5 0 5 10 15 0

50

100

150

200

250 frtmp Entries 78957

0.05 0.1 0.15 0.2 0.25 0.3 0 100 200 300 400 500 600 700 Q2 tmp 2